symver  80 80
symdir  81


80
Select the version of SYMPHONY which you have currently
installed in your system.
   
Device Drivers supplied with your card support only
the available SYMPHONY software versions as shown in 
the menu.
   
Choose the version that you have and press <Enter>. 
   
Press <Esc> to abort SYMPHONY driver installation.


81
This entry should contain a complete DOS path to your
SYMPHONY directory. It should have the following format:
   
drive:\directory
    
Type or edit the DOS path using the keys indicated at the
bottom of your screen, then press <Enter> to accept.
   
SYMPHONY software must be installed on your hard drive;
if it is not, then exit this Installation Program and
carry out the Original SYMPHONY Installation Procedure.
    
The installation program assumes that the source files are to
be copied there from the default directory. (i.e., the drive
and directory where you initiated this installation.)
Normally this would be your floppy diskette drive A:



-1


